﻿-- phpMyAdmin SQL Dump
-- version 4.2.12deb2
-- http://www.phpmyadmin.net
--
-- Host: localhost
-- Generation Time: Oct 30, 2015 at 08:33 AM
-- Server version: 5.5.44-0+deb8u1
-- PHP Version: 5.6.13-0+deb8u1

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;
--

-- --------------------------------------------------------

--
-- Table structure for table `form_parametrizacion`
--

CREATE TABLE IF NOT EXISTS `form_parametrizacion` (
`id` int(11) NOT NULL,
  `tabla` varchar(32) NOT NULL,
  `campo` varchar(32) NOT NULL,
  `opcion` varchar(200) NOT NULL,
  `descripcion` text NOT NULL,
  `visible` set('0','1') NOT NULL DEFAULT '1'
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=latin1;

--
-- Indexes for dumped tables
--

--
-- Indexes for table `form_parametrizacion`
--
ALTER TABLE `form_parametrizacion`
 ADD PRIMARY KEY (`id`), ADD KEY `id` (`id`);

--
-- AUTO_INCREMENT for dumped tables
--

--
-- AUTO_INCREMENT for table `form_parametrizacion`
--
ALTER TABLE `form_parametrizacion`
MODIFY `id` int(11) NOT NULL AUTO_INCREMENT,AUTO_INCREMENT=2;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
